diff --git a/docs/guide/mysql.textile b/docs/guide/mysql.textile
new file mode 100644
index 0000000000000000000000000000000000000000..8cb20d1d33f33ad4e80ceff44734c9267e66723d
--- /dev/null
+++ b/docs/guide/mysql.textile
@@ -0,0 +1,15 @@
+h2. 1. Editing the configuration file
+
+To configure Spectrum 2 to use MySQL database, you have to edit following options in database section:
+
+|_. Section |_. Key |_. Type |_. Change to value |_. Description |
+| database| type | string | mysql | Database type - "none", "mysql", "sqlite3", "pqxx". |
+| database| database | string | Name of the already create empty database | Database used to store data. |
+| database| server | string | Database server | Database server. |
+| database| user | string | MySQL user. | MySQL user. |
+| database| password | string | MySQL Password. | MySQL Password. |
+| database| prefix | string | | Prefix of tables in database. |
+
+h2. 2. Creating the database
+
+Spectrum 2 will create the database on the first execution. Once the database is created, you can remove the CREATE TABLE permissions to the MySQL database user you use to connect the SQL.
\ No newline at end of file
